"draw Chart" allows you to view the chart generated on the screen.  If the
chart fits normally within the screen area, your only options are this help
screen or to escape back to the Main Menu.  But if the chart does not fit
entirely within the viewing area, the cursor pad may be used to see the rest
of your chart; if the cursor keys aren't working, check the Num Lock key.

The up, down, left, and right arrow keys move the chart in small increments.

<CTRL>-<left arrow> and <CTRL>-<right arrow> page left and right respectively.

<Pg Up> and <Pg Down> move the screen up or down one screen at a time.

<Home> and <End> move straight up or straight down to top or bottom of chart.

<CTRL>-Home and <CTRL>-End move to the upper left or lower right corners
of the chart respectively.

 and  are the scroll indicators on the right edge of the screen and just
above the prompt line.  They let you know where you are in the chart.

"F" forces charts too big for the screen to fit.  The cursor keys now move a
cursor cross within the chart.  "E" expands a reduced-to-fit chart to normal
size at the area marked by the cursor.

Type any key to continue.